0 20 40 60 80 100 120 140 160 0

100

200

300

400 1.765759 ± 0.029917

CSI_0103_R

0 20 40 60 80 100 120 140 160 0 100 200 300 400 500 600 700 800 3.439406 ± 0.107378

CSI_0213_R

0 20 40 60 80 100 120 140 160 0

200

400

600

800

1000

1200

2.381635 ± 0.058484

CSI_0319_R

0 20 40 60 80 100 120 140 160 0 200 400 600 800 1000

1200

2.426142 ± 0.066936

CSI_0403_R

0 20 40 60 80 100 120 140 160 0 200 400 600 800 1000

1200

1400

1600 1.625756 ± 0.116479

CSI_0511_R