-0.2 -0.1 -0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8

-0.5

-0.4

-0.3

-0.2

-0.1 -0 0.1 0.2 0.3 0.4 0.5 Au+Au 40 MeV/n, ALPHAS MUL: 3-6

-0.2 -0.1 -0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8

-0.5

-0.4

-0.3

-0.2

-0.1 -0 0.1 0.2 0.3 0.4 0.5 Au+Au 100 MeV/n, ALPHAS MUL: 3-6

-0.2 -0.1 -0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8

-0.5

-0.4

-0.3

-0.2

-0.1 -0 0.1 0.2 0.3 0.4 0.5 Au+Au 60 MeV/n, ALPHAS MUL: 3-6

-0.2 -0.1 -0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8

-0.5

-0.4

-0.3

-0.2

-0.1 -0 0.1 0.2 0.3 0.4 0.5 Au+Au 150 MeV/n, ALPHAS MUL: 3-6

-0.2 -0.1 -0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8

-0.5

-0.4

-0.3

-0.2

-0.1 -0 0.1 0.2 0.3 0.4 0.5 Au+Au 80 MeV/n, ALPHAS MUL: 3-6

-0.2 -0.1 -0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8

-0.5

-0.4

-0.3

-0.2

-0.1 -0 0.1 0.2 0.3 0.4 0.5 Au+Ni 100 MeV/n, ALPHAS MUL: 3-6