INDRA : Xe+Sn, 25-50 MeV/n

10^{-6}

10^{-5}

10^{-4}

10^{-3}

0 100 200 300 400 500 600 700 800 900 1000

Etrans12 (MeV) counts (a.u.)

0

2

4

6

8

10

0 100 200 300 400 500 600 700 800 900 1000

Etrans12 (MeV) b (fm)

50 MeV/nucleon 45 MeV/nucleon 39 MeV/nucleon 32 MeV/nucleon 25 MeV/nucleon

scaling factor =50/(E/A) J.Ł. IPN ccsp009/jp13.kumac 11/11/97 17.37.07