INDRA at GSI: Au + Au at 60 A.MeV

0

20

40

60

80

100

0 500 1000 1500 0

2

4

6

8

10

12

E_{χ 12} (MeV) - grey levels=ΛM_{ZΓ2}Γ

M_C