0

5

10

15

20

25

30

0 20 40 60 80 100 120 140 160 180 200

ΛA_0Γ

ΛE_0Γ/ΛA_0Γ (MeV)

1000 AMeV 800 AMeV 600 AMeV

SMM_{low} SMM_{high}