10

10^2

10^3

-20 0 20 40 m-m_C

M_2 m_C = 26 Liquid Fit Region Gas Fit Region γ_{LIQ} = 1.31 β = 0.3 γ_{GAS} = 1.30

ALADIN E/A=1GeV Au+C (76157 Events)