0.8 1.0 1.2 1.4

0<Z_{BOUND}<20

0<Z_{BOUND}<20

1+ R (q )

long. (cos^2(Ψ)) trans. (sin^2(Ψ))

0 20 40 60 80 100 0.6 0.8 1.0 1.2 1.4

q (MeV/c)

1+ R (q )

long. ( 0<Ψ<50 deg.) trans. (70<Ψ<90 deg.)