0 20 40 60 80 100 120

0 1 2 3 4 5

p d t_3 He_4 He

Flow

Temperatur+Coulomb

‹ E_{CM}› = 42.3 MeV + 7.5 MeV * A

A

‹ E_{CM}› ΜMeVΝ