0

20

40

60

0 0.25 0.5 0.75 1 1.25 1.5 1.75 2 ρ/ρ_0

E (AMeV)

0 5 10 15 20 25 30

100 200 300 0 5 10 15 20 25

100 200 300

E (AMeV)

E_{Flow} (AMeV)