0 20 40 60 80

0 20 40 60

Data Avera.(No Weight) Range (No Weight) Avera.(2D) Range (2D) Avera.(3D) Range (3D) 0 2.5 5 7.5 10

0 20 40 60

0 2.5 5 7.5 10

0 20 40 60

1 1.2 1.4 1.6 1.8 2

0 20 40 60

0 0.25 0.5 0.75

0 20 40 60

0 0.25 0.5 0.75

0 20 40 60

0 0.2 0.4 0.6 0.8 1

0 20 40 60 0 0.2 0.4 0.6 0.8

0 20 40 60 80 0 0.2 0.4 0.6 0.8

0 20 40 60 80

Λ Z_{bound}Γ

Au + Au

ΛZ_{max}Γ Λγ_2Γ Λa_{12}Γ

ΛM_{IMF}Γ Λa_{23}Γ Λa_{123}Γ