0 20 40 60 80

0 20 40 60 80

Λ Φ_{12} Γ

1000 AMeV 800 AMeV 600 AMeV

0 20 40 60 80

0 20 40 60 80 Z_{bound}

Au + Au Au + Cu Au + Al Au + C Au + Be

1000 AMeV