0 100 200 300

-100 0 100

Au + Au 600 AMeV RMS/2 = 42.3 ^o

Yield (a.u.)

0 100 200 300

-100 0 100

Au + Au 800 AMeV RMS/2 = 40.5 ^o

0 100 200

-100 0 100

Au + Au 1000 AMeV RMS/2 = 42.5 ^o

Yield (a.u.)

ΔΦ_{12} (degree) 0 100 200

-100 0 100

U + U 1000 AMeV RMS/2 = 41.45 ^o

ΔΦ_{12} (degree)