0

50

100

0 20 40 60 80

Source Ψ

1000 AMeV

Z = 2 Au + Au Proj. Au + Au Preeq.

0

5

0 20 40 60 80

Λ M_{He} Γ

10^{-2}

1

0 20 40 60 80

P_{He}

Λ Z_{bound} Γ