1.02

1.04

1.06

1.08 1.1

0 20 40 60 80

0Ψ

-1Ψ

600 AMeV Z = 2Z = 3 Z = 4

ΛYΓ

1.16

1.18 1.2 1.22

0 20 40 60 80

800 AMeV 0Ψ

-1Ψ

ΛYΓ

1.28 1.3 1.32

1.34

0 20 40 60 80

1000 AMeV 0Ψ

-1Ψ Z_{bound}

ΛYΓ