1

10

10^2

0 20 40 60 80

Energy (MeV) counts p_{Zmax Γ50}

T_{low}= 5Α2 MeV T_{high}= 26Α2 MeV

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

0 20 40 60 80

Z_{max} 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

0 20 40 60 80

Y_{low} (Ψ)