10^{-1} 10 10^3

10^5

10^7

10^9

0 50 100

10^0

10^2

10^4

10^6

10^8

x10^4

x10^1

counts

6Li_7 Li

Energy (MeV) 0 0.25 0.5 0.75 1 1.25 1.5 1.75 2 2.25 2.5

0 20 40

E_{threshold} (MeV)

0.25

0.75

1.25

1.75

2.25

ratio

6Li/^7Li

-0.5

+0.0

+0.5

+1.0

Z_{bound}

60-80

40-60 20-40 0-20