0

0.1

0.2

0.3

0.4

0.5

0.6

0.7

0 10 20

E_{TH} (MeV) ratio (^3He/^4He)

Z_{bound}Λ20 20ΛZ_{bound}Λ40 40ΛZ_{bound}Λ60 60ΛZ_{bound}Λ80

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5

0 20 40 60 80

0 0.1 0.2 0.3 0.4 0.5

0 20 40 60 80

Z_{bound}

ohne Korrektur mit Korrektur

ratio (^3He/^4He) K-Faktor