0 5 10 15 20

0 20 40

ΔE_{Si(300μ)}(MeV)

ΔE_{Si(50μ)}(MeV)

0 5 10 15 20 25

0 25 50

ΔE_{Si(1000μ)}(MeV)

ΔE_{Si(300μ)}(MeV)

0 10 20 30 40 50

0 50 100 150

ΔE_{CsI}(MeV)

ΔE_{Si(1000μ)}(MeV)