0

1

2

3

0 50 100 150 200 250 d/t

0

0.5

1

1.5

0 50 100 150 200 250 t/^4He

0

0.2

0.4

0 50 100 150 200 250

3He/^4He

0

0.5

1

0 50 100 150 200 250

6Li/^7Li

0 0.1 0.2 0.3 0.4

0 50 100 150 200 250

7Be/^6Li

0 0.5 1 1.5

0 50 100 150 200 250

9Be/^8Li

0

0.2

0.4

0 50 100 150 200

11C/^{12}C

0 0.5 1 1.5

0 50 100 150 200 250

12C/^{13}C

E_{beam} ratio