5

10

15

20

25

-100 -50 0 50 100 150 200 250

400 600 800 1000

Al C Be α p C α p

A_0

ΛE_x/AΓ (MeV)

AU + X

5 10 15 20 25

50 100 150 200 250 A_0

ΛE_X/AΓ (MeV)

ΛE_XΓ α 25 MeV • ΔA

Daten