0 200 400 600 800 1000

1200

1400

0 50

Λ E_{kin} Γ (MeV)

600 AMeV

0 200 400 600 800 1000

1200

1400

0 50

800 AMeV

0 200 400 600 800 1000

1200

1400

0 50

1000 AMeV

Λ Z_{bound} Γ