Z_{bound} β_{||}

1000 AMeV 800 AMeV 600 AMeV

0.76

0.78 0.8 0.82

0.84

0.86

0.88 0.9

0 50

0.76

0.78 0.8 0.82

0.84

0.86

0.88 0.9

0 50

0.76

0.78 0.8 0.82

0.84

0.86

0.88 0.9

0 50