0

5

10

15

20

20 40 60 80

M_{IMF}

Z_{bound}

E_0 (MeV/u)

0

5

10

15

20

20 40 60 80

Z_{max}

Z_{bound}

E_0 (MeV/u)

0

5

10

15

20

0 20 40 60 80

a_{12}

Z_{bound}

E_0 (MeV/u)

0

5

10

15

20

0 20 40 60 80

a_{23}

Z_{bound}

E_0 (MeV/u)

0

5

10

15

20

0 20 40 60 80

a_{123}

Z_{bound}

E_0 (MeV/u)

0

5

10

15

20

0 20 40 60 80

γ_2

Z_{bound}

E_0 (MeV/u)