ΡZ

ΛE_{kin}Γ/ΛAΓ (MeV)

Z_{bound}Λ20 20ΛZ_{bound}Λ40 40ΛZ_{bound}Λ60 60ΛZ_{bound}Λ80

0

5

10

15

20

25

0 2 4 0

5

10

15

20

25

0 2 4 0

5

10

15

20

25

0 2 4 0

5

10

15

20

25

0 2 4 high E_0 low E_0 data_{1000AMeV}