0 20 40 60 80

0 10 20 30 40 50 60 70 80Z

bound

Z_{max}

600 AMeV 800 AMeV 1000 AMeV

0 2 4 6

0 10 20 30 40 50 60 70 80Z

bound

M_{IMF}

0 0.01

0.02

0.03

0.04

0 10 20 30 40 50 60 70 80

Z_{bound}

M_{IMF}/A_0