0

10

20

30

40

50

0 10 20 30 40 50 60 70 80 90 100 σp_{x,y} = 20 MeV/c σp_{x,y} = 60 MeV/c σp_{x,y} = 100 MeV/c σp_{x,y} = 140 MeV/c σp_{x,y} = 180 MeV/c

N_{hit}

M_N