0 25

100 150

0 25 50

100 150

0 25 50

100 150

0 25 50

100 150

0 25 50

100 150

0 25 50

100 150

0 25 50

100 150

0 25 50

100 150

0 25 50

100 150

0 25 50

100 150

0 25 50

100 150

0 25 50

100 150

0 25 50

100 150

0 25 50

100 150

0 25 50

100 150

0 25 50

100 150

0 25 50

100 150

0 25 50

100 150

0 25 50

100 150

0 25 50

100 150

0 25 50

100 150

0 25 50

100 150

0 25 50

100 150

0 25 50

100 150

0 25 50

100 150

0 25 50

100 150

0 25 50

100 150

0 25 50

100 150

0 25 50

100 150

0 25 50

100 150

0 25 50

100 150

0 25 50

100 150

0

50

100 150

0

50

100 150

0

50

100 150

0

50

100 150

0

50

100 150

0

50

100 150

0

50

100 150

0

50

100 150

ΛE_{kin}Γ (MeV)

4He

3He t d p

θ