0.5

0.75

1

1.25

1.5

0 50 100

R(Q)+1

R = 8.0 fm

0.5

0.75

1

1.25

1.5

0 50 100

R = 8.25 fm

0.5

0.75

1

1.25

1.5

0 50 100

R = 8.5 fm

0.5

0.75

1

1.25

1.5

0 50 100

R = 9.0 fm

p-p

0.5

1

1.5

0 50 100 150

0.5

1

1.5

0 50 100 150

0.5

1

1.5

0 50 100 150

0.5

1

1.5

0 50 100 150

p-α

0

2

4

0 50 100 150

0

2

4

0 50 100 150

0

2

4

0 50 100 150

0

2

4

0 50 100 150

d-α

0.5

1

1.5

2

0 50 100 150

0 ≤ Z_{bound} < 20

0.5

1

1.5

2

0 50 100 150

20 ≤ Z_{bound} < 40

0.5

1

1.5

2

0 50 100 150

40 ≤ Z_{bound} < 60

0.5

1

1.5

2

0 50 100 150

q ΜMeV/cΝ 60 ≤ Z_{bound} < 80

t-α