Abh�ngigkeit von E_{sum}

0.6

1

1.4

1.8

2.2

0 50 100 150

R(q)+1

0.6

1

1.4

1.8

2.2

0 50 100 150

0.6

1

1.4

1.8

2.2

0 50 100 150

p-α

0

1.5

3

4.5

6

0 50 100 150

0

1.5

3

4.5

6

0 50 100 150

0

1.5

3

4.5

6

0 50 100 150

d-α

0.6

1

1.4

1.8

2.2

0 50 100 150

E_{sum} < 100MeV

0.6

1

1.4

1.8

2.2

0 50 100 150

100 ≤ E_{sum} < 150MeV

0.6

1

1.4

1.8

2.2

0 50 100 150

q ΜMeV/cΝ 150MeV ≤ E_{sum}

t-α