Dichteabh�ngigkeit im QSM

0 2 4 6 8 10

0 2 4 6 8 10

T_{QSM} ΜMeVΝ

0 2 4 6 8 10

0 2 4 6 8 10 0 2 4 6 8 10

0 2 4 6 8 10 T_{Em} ΜMeVΝ

0 2 4 6 8 10 5Li

ρ = 0.06 ρ = 0.2 ρ = 0.3 ρ = 0.5

0 2 4 6 8 10

0 2 4 6 8 10

8Be

0 2 4 6 8 10

0 2 4 6 8 10

4He

0 2 4 6 8

0 2 4 6 8 10

HeLi