Radienextraktion aus d-α-Korrelationen

0 1 2 3 4 5 6

0 20 40 60

q ΜMeV/cΝ

R(q)+1

0.6 0.8 1 1.2 1.4

50 75 100 125 150

q ΜMeV/cΝ

R(q)+1

0 25 50 75 100 125 150

5 7.5 10 12.5 15

Radius ΜfmΝ

Integrales Maximum

Erstes Maximum

0

50

100

150

200

5 7.5 10 12.5 15

Radius ΜfmΝ

Integrales Maximum

Zweites Maximum