Channel number

0 100 200 300 400 500 600 700

Counts / channel

0

200

400

600

800

1000

16.6 keV αK 18.6 keV βK

(a) Mo-93

Channel number

0 50 100 150 200 250

Counts / channel

0

2000

4000

6000

8000

10000

12000 (b) Cs-137

460 keV