2 (GeV/c)

〉^2)_kp-_ip(〈

0 0.05 0.1 0.15 0.2 0.25 relative probability

0 0.2 0.4 0.6 0.8

z (fm)

-20 -10 0 10 20 x (fm)

-10

0

10