-0.2 0 0.2

-0.2 0 0.2

-0.2 0 0.2

-0.2 0 0.2

0 0.5

-0.2 0 0.2

0 0.5 0 0.5

Lithium Carbon Fluorine

40

60

80

100

150

βγ y