b/bmax versus E_{trans12}

0 0.2 0.4 0.6 0.8

0 500 1000 1500

E_{χ12} (MeV) b/b_{max}

b/bmax versus M_C

0 0.2 0.4 0.6 0.8 1

0 20 40 60 80

M_C