0 2.5 5 7.5 10 12.5 15

0 20 40 60 80

5Li

Z_{bound}

T_{HeLi} (MeV)

1000 AMeV Target (S117) 1000 AMeV Projectile (S114) 600 AMeV Projectile (S114)