0

5

10

0 5 10 15

Initial Temperature ( MeV )

T_{HeLi,0} ( MeV )

QSM ρ/ρ_0=0.1 ρ/ρ_0=0.3 ρ/ρ_0=0.5

SMMM (Gross)

GEMINI