10^{-3}

10^{-2}

10^{-1} 1

0 2 4 6 8 10

T_{QSM} (MeV)

Isotope Ratio

6Li / ^7Li

3He / ^4He

0 2 4 6 8

0 2 4 6 8 10

t

T_{HeLi,0} (MeV)

N/Z=1.40

N/Z=1.49 ρ/ρ_0=0.1

ρ/ρ_0=0.1 ρ/ρ_0=0.3

ρ/ρ_0=0.3 ρ/ρ_0=0.5

ρ/ρ_0=0.5