Centrality dependence

0.5

1

1.5

0 50 100

R(Q)+1

0.5

1

1.5

0 50 100

0.5

1

1.5

0 50 100

0.5

1

1.5

0 50 100

p-p

0

2.5

5

50 100

0

2.5

5

50 100

0

2.5

5

50 100

0

2.5

5

50 100

d-α

1

2

0 50 100

1

2

0 50 100

1

2

0 50 100

1

2

0 50 100 q ΜMeV/cΝ p-α

0

0.1

0.2

0.3

10 30 50 70

ρ_{p-p} ρ_{d-α}

Z_{bound} ρ/ρ_0