d-α correlation function

500 1000

1500

2000

2500

0 30 60 90 120 150

Coincidence spectrum 0 500 1000

1500

2000

2500 x 10^2

0 30 60 90 120 150

Background spectrum

0

1

2

3

4

0 30 60 90 120 150 q ΜMeV/cΝ

R(q)+1

Correlation function

0 100 200 300 400 500 600

0 30 60 90 120 150 q ΜMeV/cΝ

Resonance spectrum