Energy dependence

1

1.5

0 50 100

R(Q)+1

1

1.5

0 50 100

1

1.5

0 50 100

p-p

0

5

50 100

0

5

50 100

0

5

50 100

d-α

1

2

0 50 100

1

2

0 50 100

1

2

0 50 100 q ΜMeV/cΝ p-α

1

1.2

1.4

1.6

0 50 100 150 200 250

d-α p-α p-p

Pair Energy Cut ΜMeVΝ

Integrated Maximum