d=1.1 LE

0.1

0.3

0.5

0.7

0.9 x @LED 0.1

0.3

0.5

0.7

0.9

y @LED

- 0.02

- 0.01

0.00

Diff. @LED

d=1.8 LE 0.10.30.50.70.9 x @LED0.10.30.50.70.9y @LED

- 0.02 - 0.010.00

Diff. @LED 0.10.30.50.70.9 x @LED d=3.0 LE - 0.020.00