0.2

0.4

0.6

0.8

200 300 400 500 600 700 Wellenl�nge (nm)

Transmissionsgrad τ Plexiglas Xt 24370 6mm

BC 418 Optical Spectra

Photocathode Spectral Response

Emission (a.u.) bzw Transmission