0 50 100

1.0 1.2 50 100 50 100 50 100

0.0 2.0 4.0

0 100 200 0.5 1.0 1.5

1+ R (q ) 0.5 1.0 1.5

q (MeV/c)

100 200 100 200 100 200 p-p

p-α

d-α

t-α

0-20 20-40 40-60 60-79